DROP TABLE IF EXISTS `ps_jxmegalayout_hook_module_exceptions`;
CREATE TABLE `ps_jxmegalayout_hook_module_exceptions` (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `id_exceptions` int(11) NOT NULL,
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8;

